import Image from "next/image";

export default function AdminLogo() {
  return (
    <Image
      src="/assets/images/demo-slick/logo-dark.webp"
      alt="Cochise Oncology Logo"
      width={205}
      height={134}
      className="light-mode-logo"
    />
  );
}
